         180           8
   4.03325811304493        3.84540992815043        3.68172419280987     
   3.51473977449761        3.33412493300421        3.18757605265121     
   3.04410125028046        2.99901874185619     
  -18.3144500312411       -18.1641822442108       -17.8176028640459     
  -17.4434376988390       -17.0439021111096       -16.6273152330586     
  -16.1274107938860       -15.8606554473334     
  7.580019980598293E-004  0.000000000000000E+000
  0.989080720569091       0.000000000000000E+000
  0.991978349956797       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
