         180           3
  1.056709127911976E-002   2.08049443751711        4.40277159530532     
   3.22873902509344        4.43919218827718        5.80653897463214     
 -9.267501383342821E-004  0.000000000000000E+000
   1.00232004622473       0.000000000000000E+000
  0.999476087778769       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
