         180           8
   3.23437412342646        2.90206693788966        2.67153073154281     
   2.49255666096570        2.36935148326272        2.23513167849348     
   2.11350891868031        2.00150847002963     
  -19.2352297157598       -18.9830029141188       -18.6995901475495     
  -18.3726741907989       -18.0059698469143       -17.6097466005422     
  -17.2495225398681       -16.8244224833168     
  2.304308214446067E-004  0.000000000000000E+000
  0.989304652157327       0.000000000000000E+000
  0.992399853157910       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
