         180           8
   6.32476762776686        5.37394921067548        4.62626073501317     
   3.98915964241933        3.43734718270128        2.85595300480703     
   2.37719796725833        1.97379088253780     
  -8.00900824876338       -8.22679691083971       -8.43879644662453     
  -8.61234153168434       -8.84669590584778       -8.98111468222382     
  -9.01493077279565       -9.19241287132196     
 -1.647915472065877E-004  0.000000000000000E+000
  0.988237302376942       0.000000000000000E+000
  0.990972314948318       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
