         180           8
   7.45572207644431        6.70146426829898        6.02886176821338     
   5.41652501719281        4.85261119322827        4.32600278019764     
   3.78842907480565        3.33618215299246     
  -9.33130563308216       -9.59401625202384       -9.78811041235412     
  -10.0187913512888       -10.1915951307890       -10.3731722060301     
  -10.5676771946690       -10.6500111912524     
 -3.801151930683509E-004  0.000000000000000E+000
  0.988940534331311       0.000000000000000E+000
  0.991635953304183       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
