         180           8
   4.52086759994648        4.05407015454654        3.75230071758964     
   3.46330489817850        3.16302971242404        2.91119402842557     
   2.70398581250751        2.70434532362507     
  -11.6347270231338       -11.9847383676181       -12.3651015041914     
  -12.7735220601221       -12.9718993589395       -13.4416773460968     
  -14.1137407995389       -14.3832330994485     
 -2.742047172887457E-004  0.000000000000000E+000
  0.989533893579909       0.000000000000000E+000
  0.992406087297805       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
