         174           8
   4.64332903047140        4.23574035376232        3.89044241252092     
   3.56485734794186        3.24754021443341        3.00706005723241     
   2.73204368050918        2.77195130324305     
  -12.0826395558235       -12.3450678869452       -12.6501301995160     
  -12.9533046920662       -13.2277405214210       -13.4269160342691     
  -13.6082724245858       -14.0409390880079     
 -2.328500834620124E-004  0.000000000000000E+000
  0.989173205554588       0.000000000000000E+000
  0.992081612815686       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
