         180           8
   7.80707378489219        7.02934244419384        6.47619527754785     
   5.92197598890306        5.38686791281186        4.85855185660624     
   4.32156576843124        3.76763411148410     
  -7.75742795987948       -7.91543084413135       -8.03941297849825     
  -8.22785644378736       -8.47748313310873       -8.72931863054426     
  -8.94348009972439       -9.13382058015523     
 -2.476156305414837E-004  0.000000000000000E+000
  0.989307462837183       0.000000000000000E+000
  0.992133225448502       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
