         180           8
   5.73597728483822        5.52228351654183        5.36137297807769     
   5.19260745368249        5.05876192963924        4.94457402587093     
   4.82811653080012        4.66247169404225     
  -12.8874788932454       -12.7087926063795       -12.4297405456757     
  -12.1273667935485       -11.6829466539958       -11.2001493816393     
  -10.7583853131986       -10.2606082850779     
 -3.521631422618008E-004  0.000000000000000E+000
  0.989494764712644       0.000000000000000E+000
  0.992436655318574       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
