         180           8
   5.91763774213702        5.70181665209301        5.52157288952870     
   5.37455199567215        5.24362391849569        5.07710008954183     
   4.96531932979428        4.90367056716589     
  -12.9449475727094       -12.7009479903168       -12.3734966875784     
  -12.0202879708771       -11.6530777982049       -11.2590148792991     
  -10.8642394363486       -10.4692421731550     
 -2.810452854712703E-004  0.000000000000000E+000
  0.989324919706384       0.000000000000000E+000
  0.992371840699204       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
