         180           8
   7.77467977321453        7.39805184383216        6.69209001724158     
   6.05185504174587        5.55232705327438        4.92414399062598     
   4.29027955277192        3.75846890799171     
  -10.1846760687491       -10.2450234479363       -10.4328941145416     
  -10.6176801956153       -10.8010586117229       -11.1337213988690     
  -11.4930895436133       -11.6345948453576     
 -6.077196915871585E-004  0.000000000000000E+000
  0.989399230591576       0.000000000000000E+000
  0.992097786013583       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
