         180           8
   8.34479758436293        7.67461741621295        7.04185257599369     
   6.41488703705800        5.81011126012481        5.25080179905820     
   4.69471261003356        4.18239489363480     
  -10.3239970772335       -10.3867709815748       -10.5157536813674     
  -10.6781884783334       -10.9004910206175       -11.1416067526356     
  -11.3927280539646       -11.6503944064107     
 -6.833643238185099E-004  0.000000000000000E+000
  0.989783088059864       0.000000000000000E+000
  0.992786893890239       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
