         180           8
   4.89871898145563        4.32223333483002        3.72350751419370     
   3.17552274501862        2.59362605423904        2.08133863667291     
   1.64483597037654        1.16050943769826     
  -9.10243524050861       -9.15412718530807       -9.30716814209030     
  -9.53896548077356       -9.79792645207288       -10.0237211498809     
  -10.2754346901059       -10.5579376987491     
 -4.140877469949593E-004  0.000000000000000E+000
  0.989208554454106       0.000000000000000E+000
  0.992124493117504       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
