         180           8
   4.41176033343787        3.83071029460300        3.28890905215469     
   2.73675690821476        2.21309283526764        1.75301150434401     
   1.28791081340537        1.10698576127389     
  -9.02606712625087       -9.10072175496882       -9.30509048072258     
  -9.50572250305878       -9.72315025135152       -9.97921582146039     
  -10.2114925925765       -10.5070510300768     
 -4.106712917025979E-004  0.000000000000000E+000
  0.989136630047347       0.000000000000000E+000
  0.991974136298977       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
