         174           8
   2.61926724772075        2.42731145272568        2.25510702464992     
   2.11070773571895        2.01089750840358        1.95341346308637     
   1.86371998253322        1.71910383674079     
  -13.4564790368116       -13.4351785514875       -13.1925784220887     
  -12.7497936605962       -12.2085649124984       -11.6996995422652     
  -11.1956802722111       -10.9843662253784     
 -8.967526163034652E-005  0.000000000000000E+000
  0.988641855716655       0.000000000000000E+000
  0.991920020468441       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
