         180           8
   1.80604198858763        1.67183414659594        1.55559270447673     
   1.44164367674272        1.37914568019002        1.32767924321974     
   1.25619261947592        1.06149221215660     
  -12.8399350759105       -12.6415209004753       -12.2673935065680     
  -11.8554195433825       -11.3998186412318       -10.9749377160121     
  -10.5807965142452       -10.1948236622961     
 -3.645935360854879E-005  0.000000000000000E+000
  0.988733632140754       0.000000000000000E+000
  0.991770631374276       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
