         180           8
   2.48623274606559        2.21427466323917        2.08501382844965     
   1.91037860363816        1.72714641945104        1.59093235945228     
   1.49570257909937        1.34208754775912     
  -12.7790577490626       -12.7280485214932       -12.4242175423638     
  -12.0407613545616       -11.6336220771910       -11.2156072152567     
  -10.8556968620596       -10.4417948214710     
  1.262932160982594E-004  0.000000000000000E+000
  0.992216162009344       0.000000000000000E+000
  0.995318429715284       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
