         180           8
   7.35432551842354        6.73543328494090        6.17154247789272     
   5.49057114862700        4.84302795146424        4.27932129258998     
   3.68406649257291        3.10381871879849     
  -8.92505042768765       -9.01180176265460       -9.04192192202592     
  -9.18286757046804       -9.36531506928096       -9.52332275305277     
  -9.76507350051184       -9.90391561164383     
  1.246809053107947E-004  0.000000000000000E+000
  0.992201722311815       0.000000000000000E+000
  0.995116475637038       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
