         180           8
   3.62124004063587        3.34273653521357        2.97168131751701     
   2.63020939927595        2.33136108652712        2.06947076737763     
   1.86141704572901        1.77433745264896     
  -13.8594718197840       -14.0549102925946       -14.3553664710464     
  -14.6296652132068       -14.9019078117633       -15.1403778568915     
  -15.2880521161532       -15.6783524974637     
 -8.346391057795466E-005  0.000000000000000E+000
  0.992639895553838       0.000000000000000E+000
  0.995616274638508       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
