         180           8
   4.36749747425733        4.18039133381343        4.02030610363266     
   3.89920296808220        3.74074123159972        3.58262974564608     
   3.48922124610561        3.32559566225520     
  -14.9810716971953       -14.7333919054341       -14.3990022471757     
  -14.0387564514490       -13.6445129442522       -13.2011157682497     
  -12.7930802571145       -12.4376592994936     
 -2.637066275295541E-004  0.000000000000000E+000
  0.992923717369671       0.000000000000000E+000
  0.996022011659654       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
