         180           8
   6.45505542762245        5.93097711268676        5.29811953617028     
   4.67948453228263        4.10607273262843        3.55552089259847     
   3.02134205634018        2.51464226981000     
  -10.5761224550378       -10.6895183478385       -10.8155049855203     
  -11.0054092664301       -11.1654292218440       -11.3761943138715     
  -11.6614568363038       -11.9417108663107     
 -4.851169245311883E-004  0.000000000000000E+000
  0.993277261233522       0.000000000000000E+000
  0.996227065446957       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
