         180           8
   6.51520932774102        5.79653951181121        5.18262431719336     
   4.55795543233756        3.97038030209175        3.38951354749004     
   2.85538264414600        2.38212410399134     
  -10.4736159249245       -10.6586419358509       -10.7983260727115     
  -11.0425789490702       -11.2827374923225       -11.5063581708125     
  -11.7580468223915       -12.1081069000484     
 -3.472789543738679E-004  0.000000000000000E+000
  0.993040455931574       0.000000000000000E+000
  0.996017581946697       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
