         172           8
   2.29671314280348        1.94828701954344        1.62116896639901     
   1.30199341720930       0.985055276707019       0.694354693090346     
  0.516529959660791       0.425969849313147     
  -11.6929310582942       -11.9569638612033       -12.1790476215352     
  -12.4622507545808       -12.7527726106005       -12.9742476171323     
  -13.2257471853411       -13.5147885523160     
  1.731845194855679E-004  0.000000000000000E+000
  0.992341886452046       0.000000000000000E+000
  0.995491948436696       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
