<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;"> -2.593047E-04  rotation in radian
  8.471455E+00  dx in pixels
 -1.426757E+01  dy in pixels
      0.993116  scale x
      0.996332  scale y
         4.000  tolerance
  0.000000E+00  distortion
</pre></body></html>