         180           8
   4.94644016153866        4.60042216305072        4.24342651245126     
   3.91976357109379        3.58420526861501        3.31916851536585     
   3.17530247804043        3.08252047997912     
  -13.9746330933220       -14.9051703325255       -15.3602760851228     
  -15.8529904478539       -16.4368264956446       -16.8699035254448     
  -17.2317585514415       -17.6314714485843     
 -5.690393810054092E-004  0.000000000000000E+000
  0.993519395250775       0.000000000000000E+000
  0.996774798037947       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
