         180           8
   2.74717926068887        2.54355698494009        2.31946953264035     
   2.17530477346954        2.08357691419632        1.92844667362839     
   1.79002573529577        1.66759769453319     
  -9.09733454712090       -8.98102834970129       -8.59664121764108     
  -8.23193797441105       -7.88034551420110       -7.47706990686004     
  -6.98704809392735       -6.59172638289106     
  6.227246007668903E-004  0.000000000000000E+000
  0.991960123331491       0.000000000000000E+000
  0.994907138506989       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
