         180           8
   2.83047407825275        2.70091222718812        2.53122055471228     
   2.35760191886623        2.20109905359748        2.07778450166898     
   1.98452881416374        1.87548756590929     
  -8.71480425367044       -8.60453053726312       -8.31748546766916     
  -7.99354517561157       -7.55431901449619       -7.13420243522810     
  -6.80860424039198       -6.33151304621854     
  7.178082237698239E-004  0.000000000000000E+000
  0.991902053153831       0.000000000000000E+000
  0.994863067437250       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
