         180           8
   6.23400655939444        5.74653079915862        5.20608057890927     
   4.64592962185398        4.03926610461633        3.43873020527572     
   2.88204468835376        2.36929760552423     
  -10.5850063975573       -10.1771408102196       -9.68844207128919     
  -9.41158793723283       -9.14069023931118       -8.95212534252609     
  -8.82204727527768       -8.67524883086742     
 -8.884236318150848E-004  0.000000000000000E+000
  0.992824104579240       0.000000000000000E+000
  0.996097831071962       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
