         180           8
 -1.353054967503162E-002 -0.278704527552814      -0.405720737349613     
 -0.550644760004091      -0.728574717420356      -0.902075717116910     
  -1.01017939250308       -1.17984165411115     
  -6.16991257434941       -5.57332811248102       -4.93771446448404     
  -4.21817789068204       -3.44602520870395       -2.64057042508099     
  -1.89425056712454       -1.03841278431431     
  1.074826502110676E-003  0.000000000000000E+000
  0.991332248494321       0.000000000000000E+000
  0.994075951343105       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
