         180           3
   6.75107562414524        8.27939463263098        10.0381622436032     
   26.7162701333205        28.6760231780653        30.5797410376301     
 -1.763972562997893E-003  0.000000000000000E+000
   1.00116163133160       0.000000000000000E+000
  0.997969200192454       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
