         180           8
 -0.213978119924597      -0.426007198933484      -0.606387493384761     
 -0.803139396188642      -0.966585131575157       -1.13476248671680     
  -1.25118109425487       -1.51100045021592     
  -6.28644285911890       -6.65173504912039       -6.62423409835702     
  -6.44401961512251       -6.09758763196903       -5.75855898099037     
  -5.41555832562431       -5.32267635393998     
  1.133513433640416E-003  0.000000000000000E+000
  0.991034069513308       0.000000000000000E+000
  0.993859387309420       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
