         180           8
 -0.530469874598891      -0.721928158635015      -0.898461503214845     
  -1.09398928797392       -1.22564328015505       -1.35333135042230     
  -1.48868895927873       -1.52489330956240     
  -7.67647770853741       -7.48182204168489       -7.17929098170548     
  -6.82877063428672       -6.44707237326965       -6.05928416661455     
  -5.64727505945390       -5.07125754626122     
  1.226057884586410E-003  0.000000000000000E+000
  0.990772490939373       0.000000000000000E+000
  0.993812559005790       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
