         180           8
 -0.534907081492885      -0.723088060055367      -0.914141822720878     
  -1.07890056239488       -1.21567832958441       -1.37524246978847     
  -1.53683150670902       -1.64780267764039     
  -7.60240130363018       -7.42825860179917       -7.17913949958632     
  -6.84113096171990       -6.46666499625055       -6.06703077276376     
  -5.66947090213010       -5.13490436772153     
  1.242675697154013E-003  0.000000000000000E+000
  0.990835725038725       0.000000000000000E+000
  0.993853146066685       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
