         180           8
  0.763718254508074       0.620128568772326       0.370564915497228     
  0.137372862289195      -2.746388234733999E-002 -0.186678148794743     
 -0.359551149813326      -0.568852801519718     
  -10.1773682790735       -9.62733981410631       -9.28006082591465     
  -8.95361343524140       -8.54902228494979       -8.05612131037372     
  -7.62964337835458       -7.39397530238295     
  4.656290368105519E-004  0.000000000000000E+000
  0.991835261155858       0.000000000000000E+000
  0.994428813332360       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
