         180           8
  0.239451704509623       0.125321923471180      -7.325599990359721E-002
 -0.232308419267208      -0.351359197662303      -0.520366822926284     
 -0.651551128099243      -0.689722771284551     
  -9.68808742815821       -9.56748130320988       -9.26293962510084     
  -8.91634182307010       -8.53555237537968       -8.10878375735834     
  -7.64563348798877       -7.39143246892733     
  5.968337724460047E-004  0.000000000000000E+000
  0.991906456637607       0.000000000000000E+000
  0.994389213487688       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
