         180           8
  0.153091163397445       1.334521758338075E-002 -0.173532013582696     
 -0.317764776590812      -0.448084839885216      -0.615448623334770     
 -0.735527837629484      -0.991231178002567     
  -9.38277619611910       -9.22739378033184       -8.93134465632997     
  -8.58410968086422       -8.21022171382115       -7.83189628130865     
  -7.42127210639593       -7.04484296796469     
  6.719255614793251E-004  0.000000000000000E+000
  0.991772979170773       0.000000000000000E+000
  0.994394088767344       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
