         180           8
 -6.851118787606005E-003 -0.139382048665748      -0.324563584414655     
 -0.497049242939322      -0.653840046988105      -0.852732986432686     
 -0.950315642409725       -1.25221448449958     
  -9.64085285983731       -9.35550838603835       -9.09505234571053     
  -8.74001750092337       -8.24661185448896       -7.75701688747895     
  -7.30332944380208       -6.95965937864686     
  6.911373894836621E-004  0.000000000000000E+000
  0.991706699930530       0.000000000000000E+000
  0.994201184951703       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
