         180           3
   5.75383871900886        7.34842262577451        9.15613218152398     
   22.5661034383864        23.4197974938742        24.1771972041512     
 -1.595285072651867E-003  0.000000000000000E+000
   1.00115145596550       0.000000000000000E+000
  0.998173765560631       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
