         180           8
 -0.197538478736751      -0.351186792238256      -0.456700749763400     
 -0.622504329878537      -0.771900510418115      -0.884626347616393     
  -1.01366888085272       -1.28171865413797     
  -9.53592712801694       -9.27709997850248       -8.88927944883391     
  -8.49231642249979       -8.05703371453784       -7.60116187989596     
  -7.14303384444037       -6.77676052056796     
  8.518178888860235E-004  0.000000000000000E+000
  0.991452352814738       0.000000000000000E+000
  0.994010884971858       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
