         180           8
 -0.448308762368339      -0.718729846024629      -0.881786496804844     
  -1.06478283096494       -1.21737043361660       -1.34224175220915     
  -1.47625593798432       -1.60093889774887     
  -7.01396958243494       -6.79973221010631       -6.50846625283550     
  -6.13116686236748       -5.74974656956240       -5.36669695687242     
  -4.94571403605376       -4.57142128464413     
  1.122494366981317E-003  0.000000000000000E+000
  0.991490222592546       0.000000000000000E+000
  0.994370239502783       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
