         180           8
 -0.459218402041585      -0.566133279210792      -0.768585181985151     
 -0.897070074545331       -1.02350083449652       -1.19665117121520     
  -1.30395393312878       -1.50612660000074     
  -7.23382274490758       -6.99689569018827       -6.67045129615858     
  -6.29794818363307       -5.89822178412033       -5.49944025965557     
  -5.07433893047783       -4.66412815805721     
  9.971360051730883E-004  0.000000000000000E+000
  0.991619274763175       0.000000000000000E+000
  0.994523613951097       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
