         180           8
   3.33225756607807        2.64860454464431        1.99716047130166     
   1.40458836758617       0.800723490161859       0.213053169017852     
 -0.318821798947007      -0.739249550601679     
  -5.85417156598436       -5.91699040849798       -5.98639325267908     
  -6.14734052372653       -6.38665888363124       -6.63403711775864     
  -6.89290791745264       -7.07573888472679     
  2.763012461970991E-004  0.000000000000000E+000
  0.992667481447619       0.000000000000000E+000
  0.995315448285363       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
