         180           8
   1.97443037129158        1.81361184455350        1.63366686314709     
   1.47039487338994        1.32272544858271        1.18577505161617     
   1.10136831487541        1.03882497496157     
  -13.6217448490030       -13.3513601661123       -13.0304400109362     
  -12.6645176337305       -12.2236881897075       -11.7850567689718     
  -11.4323220569001       -11.0346005269167     
 -5.364943475583826E-005  0.000000000000000E+000
  0.992696485624387       0.000000000000000E+000
  0.995666245573887       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
