         180           3
   4.28094957860021        5.92490228361642        7.78747428366338     
   18.0227786921240        18.8942560461782        19.6648092841258     
 -1.656249451234186E-003  0.000000000000000E+000
   1.00153364196558       0.000000000000000E+000
  0.998947433809868       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
