         180           8
   2.27785531373202        2.12398823006729        1.96273916288675     
   1.78911801493239        1.65306537173285        1.52860835141317     
   1.40632421013030        1.33744466470136     
  -14.1089301432692       -13.9029656482579       -13.5927070622704     
  -13.2408459214491       -12.8708571064631       -12.4811471212078     
  -12.0560602444674       -11.7194374876924     
 -8.007093113110249E-005  0.000000000000000E+000
  0.992667294951626       0.000000000000000E+000
  0.995682883760638       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
