         180           3
   4.37080554075267        6.06333293508512        7.93326893412136     
   17.6175421333991        18.3632750264673        19.1424845106526     
 -1.644694266697901E-003  0.000000000000000E+000
   1.00160744172878       0.000000000000000E+000
  0.998750266139077       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
