         180           8
   2.10544988882078        1.90905715494617        1.75958599700806     
   1.59473967120759        1.43674689090776        1.32810814824870     
   1.19708889426055        1.10723349547530     
  -14.0865550320599       -13.8990264334433       -13.5726833272804     
  -13.2411127211342       -12.8785451685089       -12.4860025961885     
  -12.0804208554556       -11.7074866241679     
 -5.707083560224820E-005  0.000000000000000E+000
  0.992555810097206       0.000000000000000E+000
  0.995537205139447       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
