         180           8
   2.10667061604915        1.80186351813536        1.66975615685866     
   1.52436463721935        1.39660673661084        1.28474932061949     
   1.16242096370159        1.02995073257651     
  -13.9673521926425       -13.7429150433111       -13.4186079243310     
  -13.0820123497107       -12.7027291683118       -12.3193900139892     
  -11.9017689603380       -11.4758182395187     
 -1.594004399295189E-005  0.000000000000000E+000
  0.992577427061670       0.000000000000000E+000
  0.995466581478925       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
