         180           8
  -1.20364544128086       -1.50916328316290       -1.84065264987649     
  -2.16073032465144       -2.43815075001729       -2.65380419429251     
  -2.83178671287593       -3.08422913884445     
  -7.56953316836569       -7.91654239327446       -8.18093609180341     
  -8.47497918699174       -8.82437576036476       -9.03537242979305     
  -9.60693486027526       -10.5566936045710     
  1.024117698124247E-003  0.000000000000000E+000
  0.991271666758349       0.000000000000000E+000
  0.994465944410113       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
