         180           8
 -0.231082885085280      -0.656263078049597       -1.00118127439922     
  -1.32812168810826       -1.58373651202751       -1.77883821022144     
  -1.91154225619382       -1.91634791599924     
  -10.6071883355363       -10.8789783997782       -11.1510612475377     
  -11.4148955934778       -11.6882777871023       -11.9572012933514     
  -12.2208359379801       -12.5909753683214     
  8.174570733589593E-004  0.000000000000000E+000
  0.991360068948667       0.000000000000000E+000
  0.994289310663227       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
